Copyright: Monday, July 09, 2001 08:15:18


Closes this dialog box and saves any changes that you have made.


Closes this dialog box without saving any changes that you have made.


Displays the name that users need to use to connect to the shared folder.


Provides a space for you to type a comment about the shared folder, if needed. A comment is optional.


Allows the maximum number of users to connect to the shared folder at one time.


Limits the number of users who can connect to the shared folder at one time.


Specifies the number of users who can connect to the shared folder at one time.


Click to set permissions for the shared folder.


Stops sharing this folder.


Shares this folder so that other users can access it over the network. When you share a folder, you can limit the number of users who can access the folder, and you can set up shared folder permissions that restrict the folder's availability over the network to only specific users.


Displays the name or names by which this folder is shared.


Removes the shared folder in Share Name.


Creates another shared folder for this folder.


Maximum Allowed specifies that the highest possible number of users can connect to the shared folder at one time.

Allow Users limits the number of users who can connect to the shared folder at one time.